From 7b8dbd81f2bc716aa1335c4adacf1764834c3bce Mon Sep 17 00:00:00 2001
From: Neels Hofmeyr <nhofmeyr@sysmocom.de>
Date: Mon, 15 May 2017 15:28:34 +0200
Subject: OsmoGSMTester: say 'modems', not 'modem' (sounds like it supports
 only one)

Change-Id: Ib59788a50754ea5290e665a9f9376d70e01c9be5
---
 doc/manuals/chapters/install.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/manuals/chapters/install.adoc')

diff --git a/doc/manuals/chapters/install.adoc b/doc/manuals/chapters/install.adoc
index 17905be..2a20ebd 100644
--- a/doc/manuals/chapters/install.adoc
+++ b/doc/manuals/chapters/install.adoc
@@ -27,7 +27,7 @@ pip3 install pydbus
 ----
 
 IMPORTANT: ofono may need to be installed from source to contain the most
-recent fixes needed to operate your modem. This depends on the modem hardware
+recent fixes needed to operate your modems. This depends on the modem hardware
 used and the tests run. Please see <<hardware_modems>>.
 
 To run osmo-bts-trx with a USRP attached, you may need to install a UHD driver.
-- 
cgit v1.2.3

