From dd4160e00331a9df8e0c5ce9a673f31bac0218a6 Mon Sep 17 00:00:00 2001
From: Neels Hofmeyr <neels@hofmeyr.de>
Date: Thu, 1 Dec 2016 03:02:03 +0100
Subject: dynamic timeslots: add BSC level config instructions

Add high level description on and a config example for dynamic timeslots in a
new chapter featured in the OsmoBSC and OsmoNITB manuals.

From the OsmoBTS manual's chapter on dynamic timeslots, add references to the
above.

Change-Id: I44ff1e4c2340c65ff23e85408fc6d6a45ea9e046
---
 doc/manuals/chapters/dynamic-timeslots.adoc | 9 ++++++---
 1 file changed, 6 insertions(+), 3 deletions(-)

(limited to 'doc/manuals/chapters/dynamic-timeslots.adoc')

diff --git a/doc/manuals/chapters/dynamic-timeslots.adoc b/doc/manuals/chapters/dynamic-timeslots.adoc
index 29dff5b7..7c43d187 100644
--- a/doc/manuals/chapters/dynamic-timeslots.adoc
+++ b/doc/manuals/chapters/dynamic-timeslots.adoc
@@ -7,11 +7,14 @@ channel configurations, initiated by the BSC via (non-standard) Abis messages
 The Abis message handling for dynamic timeslots is independent of the BTS
 model. However, dynamic switchover will only work for BTS models that implement
 the internal API to reconnect a timeslot (_bts_model_ts_disconnect()_ and
-_bts_model_ts_connect()_).  Currently, these BTS models support dynamic
-timeslots:
+_bts_model_ts_connect()_, see also <<osmobts_hardware_support>>).
+
+Currently, these OsmoBTS models support dynamic timeslots:
 
 * _osmo-bts-sysmo_
 * _osmo-bts-litecell15_
 * _osmo-bts-trx_
 
-See also <<osmobts_hardware_support>>.
+Dynamic timeslots are driven by the BSC and need to be configured there. When
+using OsmoBSC or OsmoNITB, see the BTS configuration chapter on dynamic
+timeslots in <<userman-osmobsc>> or <<userman-osmonitb>>, respectively.
-- 
cgit v1.2.3

