From d22e31fc9b0639b87c1b394286492549b433b0e8 Mon Sep 17 00:00:00 2001
From: Neels Hofmeyr <neels@hofmeyr.de>
Date: Thu, 7 Dec 2017 19:41:54 +0100
Subject: common / OsmoBSC: drop unused alink.adoc

Change-Id: Ia3219359be891c161d20eccb7bbcb65af35ef42b
---
 doc/manuals/chapters/alink.adoc | 15 ---------------
 1 file changed, 15 deletions(-)
 delete mode 100644 doc/manuals/chapters/alink.adoc

(limited to 'doc/manuals/chapters/alink.adoc')

diff --git a/doc/manuals/chapters/alink.adoc b/doc/manuals/chapters/alink.adoc
deleted file mode 100644
index 0321c0e02..000000000
--- a/doc/manuals/chapters/alink.adoc
+++ /dev/null
@@ -1,15 +0,0 @@
-== A-link including SCCP/BSSAP/DTAP
-
-OsmoBSC implements a minimal sub-set of the GSM A interface as specified
-in TS 08.08.
-
-Unlike classic A interface implementations for E1 interfaces, OsmoBSC
-implements a variant of encapsulating the A interface over IP.  To do
-so, the SCCP messages are wrapped in an IPA multiplex and then
-communicated over TCP.  The audio channels are mapped to RTP streams.
-
-This protocol stacking is sometimes called "SCCPlite".
-
-===
-
-FIXME
-- 
cgit v1.2.3

